From e16230b3ce3f5d8ef820bffb314cdca703a2819f Mon Sep 17 00:00:00 2001
From: "jani@a193-229-222-105.elisa-laajakaista.fi" <>
Date: Tue, 13 Dec 2005 17:53:26 +0200
Subject: Increased stack size for clients on Netware. New libc suggests doing
 this.

---
 netware/perror.def | 1 +
 1 file changed, 1 insertion(+)

(limited to 'netware/perror.def')

diff --git a/netware/perror.def b/netware/perror.def
index f1d23715f55..52cdb36afbe 100644
--- a/netware/perror.def
+++ b/netware/perror.def
@@ -5,6 +5,7 @@ MODULE	libc.nlm
 COPYRIGHT "(c) 2003 Novell, Inc. Portions (c) 2003 MySQL AB. All Rights Reserved."
 DESCRIPTION "MySQL Error Code Description Tool"
 VERSION 4, 0
+STACKSIZE 32768
 XDCDATA ../netware/mysql.xdc
 #DEBUG
 
-- 
cgit v1.2.1

