From ea132547b88b727a2b71b15c72a59498c03e4628 Mon Sep 17 00:00:00 2001
From: unknown <kent@mysql.com/kent-amd64.(none)>
Date: Fri, 1 Dec 2006 23:09:14 +0100
Subject: mysql_upgrade.def Makefile.am:   Added new "mysql_upgrade.def" for
 Netware (bug#23504) *.def:   Allocate 128K stack for all executables
 (bug#23504)

netware/comp_err.def:
  Allocate 128K stack for all executables (bug#23504)
netware/isamchk.def:
  Allocate 128K stack for all executables (bug#23504)
netware/isamlog.def:
  Allocate 128K stack for all executables (bug#23504)
netware/libmysql.def:
  Allocate 128K stack for all executables (bug#23504)
netware/my_print_defaults.def:
  Allocate 128K stack for all executables (bug#23504)
netware/myisam_ftdump.def:
  Allocate 128K stack for all executables (bug#23504)
netware/myisamchk.def:
  Allocate 128K stack for all executables (bug#23504)
netware/myisamlog.def:
  Allocate 128K stack for all executables (bug#23504)
netware/myisampack.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysql.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysql_install_db.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysql_test_run.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysql_waitpid.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysqladmin.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysqlbinlog.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysqlcheck.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysqld.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysqld_safe.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysqldump.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysqlimport.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysqlshow.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysqltest.def:
  Allocate 128K stack for all executables (bug#23504)
netware/pack_isam.def:
  Allocate 128K stack for all executables (bug#23504)
netware/perror.def:
  Allocate 128K stack for all executables (bug#23504)
netware/replace.def:
  Allocate 128K stack for all executables (bug#23504)
netware/resolve_stack_dump.def:
  Allocate 128K stack for all executables (bug#23504)
netware/resolveip.def:
  Allocate 128K stack for all executables (bug#23504)
netware/mysql_upgrade.def:
  BitKeeper file /home/kent/bk/mysql-5.0-build/netware/mysql_upgrade.def
netware/Makefile.am:
  Added "mysql_upgrade.def"
---
 netware/libmysql.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'netware/libmysql.def')

diff --git a/netware/libmysql.def b/netware/libmysql.def
index 8a34754e092..d9d4c752612 100644
--- a/netware/libmysql.def
+++ b/netware/libmysql.def
@@ -7,6 +7,6 @@ COPYRIGHT "(c) 2003-2005 Novell, Inc. Portions (c) 2003 MySQL AB. All Rights Res
 DESCRIPTION "MySQL Client Library"
 VERSION 4, 0
 AUTOUNLOAD
-STACKSIZE 32768
+STACKSIZE 131072
 XDCDATA ../netware/mysql.xdc
 #DEBUG
-- 
cgit v1.2.1

