From 99c55577c534b6ee242b7100839dcea4328fab6a Mon Sep 17 00:00:00 2001
From: unknown <jani@a193-229-222-105.elisa-laajakaista.fi>
Date: Tue, 13 Dec 2005 17:53:26 +0200
Subject: Increased stack size for clients on Netware. New libc suggests doing
 this.

---
 netware/libmysql.def | 1 +
 1 file changed, 1 insertion(+)

(limited to 'netware/libmysql.def')

diff --git a/netware/libmysql.def b/netware/libmysql.def
index 7804c4468a5..3d7d0b2f7fe 100644
--- a/netware/libmysql.def
+++ b/netware/libmysql.def
@@ -7,5 +7,6 @@ COPYRIGHT "(c) 2003 Novell, Inc. Portions (c) 2003 MySQL AB. All Rights Reserved
 DESCRIPTION "MySQL Client Library"
 VERSION 4, 0
 AUTOUNLOAD
+STACKSIZE 32768
 XDCDATA ../netware/mysql.xdc
 #DEBUG
-- 
cgit v1.2.1

