From a9150f00078064c9c4eaca0329ad6e3c16d7ec4c Mon Sep 17 00:00:00 2001
From: Sneha Modi <sneha.modi@oracle.com>
Date: Thu, 10 Nov 2011 17:18:41 +0530
Subject: Bug#11748731 - 37248: SOME 'BIG' TESTS FAILING ON 6.0:

alter_treable-big.test was failing due to the use of RAND() function which is no more
replication safe.
This has been modified using static values.

Also, 'sleep' has been replaced using 'debug_sync' and the execution time of the
test has been reduced significantly.

This test is now taken out of the disabled.def file and is being enabled.
---
 mysql-test/t/disabled.def | 1 -
 1 file changed, 1 deletion(-)

(limited to 'mysql-test/t/disabled.def')

diff --git a/mysql-test/t/disabled.def b/mysql-test/t/disabled.def
index 08db85a3f45..cb1de2cb0ff 100644
--- a/mysql-test/t/disabled.def
+++ b/mysql-test/t/disabled.def
@@ -12,7 +12,6 @@
 lowercase_table3         : Bug#11762269 2010-06-30 alik main.lowercase_table3 on Mac OSX
 read_many_rows_innodb    : Bug#11748886 2010-11-15 mattiasj report already exists
 sum_distinct-big         : Bug#11764126 2010-11-15 mattiasj was not tested
-alter_table-big          : Bug#11748731 2010-11-15 mattiasj was not tested
 create-big               : Bug#11748731 2010-11-15 mattiasj was not tested
 archive-big              : Bug#11817185 2011-03-10 Anitha Disabled since this leads to timeout on Solaris Sparc
 log_tables-big           : Bug#11756699 2010-11-15 mattiasj report already exists
-- 
cgit v1.2.1

