From a9150f00078064c9c4eaca0329ad6e3c16d7ec4c Mon Sep 17 00:00:00 2001
From: Sneha Modi <sneha.modi@oracle.com>
Date: Thu, 10 Nov 2011 17:18:41 +0530
Subject: Bug#11748731 - 37248: SOME 'BIG' TESTS FAILING ON 6.0:

alter_treable-big.test was failing due to the use of RAND() function which is no more
replication safe.
This has been modified using static values.

Also, 'sleep' has been replaced using 'debug_sync' and the execution time of the
test has been reduced significantly.

This test is now taken out of the disabled.def file and is being enabled.
---
 mysql-test/t/disabled.def | 1 -
 1 file changed, 1 deletion(-)

(limited to 'mysql-test/t/disabled.def')

diff --git a/mysql-test/t/disabled.def b/mysql-test/t/disabled.def
index 08db85a3f45..cb1de2cb0ff 100644
--- a/mysql-test/t/disabled.def
+++ b/mysql-test/t/disabled.def
@@ -12,7 +12,6 @@
 lowercase_table3         : Bug#11762269 2010-06-30 alik main.lowercase_table3 on Mac OSX
 read_many_rows_innodb    : Bug#11748886 2010-11-15 mattiasj report already exists
 sum_distinct-big         : Bug#11764126 2010-11-15 mattiasj was not tested
-alter_table-big          : Bug#11748731 2010-11-15 mattiasj was not tested
 create-big               : Bug#11748731 2010-11-15 mattiasj was not tested
 archive-big              : Bug#11817185 2011-03-10 Anitha Disabled since this leads to timeout on Solaris Sparc
 log_tables-big           : Bug#11756699 2010-11-15 mattiasj report already exists
-- 
cgit v1.2.1


From 7ee2962f192e21c0e30cf030e719e1396f7be1ad Mon Sep 17 00:00:00 2001
From: Sneha Modi <sneha.modi@oracle.com>
Date: Mon, 21 Nov 2011 17:07:08 +0530
Subject: Bug#11748731:SOME 'BIG' TESTS FAILING ON 6.0

A patch for alter_table-big.test has been committed earlier.
This is a patch for create-big.test:
The test used to time-out after 900 seconds.
It relied on debug sleeps that are no longer present in the
code. Since the sleeps are long gone, fixing the problem didn't
involve just updating the result file or using macro
"show_binlog_events2.inc" instead of "show binlog events"
statement. The test needed to be rewritten using debug sync
points, and result then needed to be updated.
So, the sleeps have been replaced by debug_sync points and the test execution time has
been reduced significantly.
---
 mysql-test/t/disabled.def | 1 -
 1 file changed, 1 deletion(-)

(limited to 'mysql-test/t/disabled.def')

diff --git a/mysql-test/t/disabled.def b/mysql-test/t/disabled.def
index cb1de2cb0ff..81600642c15 100644
--- a/mysql-test/t/disabled.def
+++ b/mysql-test/t/disabled.def
@@ -12,7 +12,6 @@
 lowercase_table3         : Bug#11762269 2010-06-30 alik main.lowercase_table3 on Mac OSX
 read_many_rows_innodb    : Bug#11748886 2010-11-15 mattiasj report already exists
 sum_distinct-big         : Bug#11764126 2010-11-15 mattiasj was not tested
-create-big               : Bug#11748731 2010-11-15 mattiasj was not tested
 archive-big              : Bug#11817185 2011-03-10 Anitha Disabled since this leads to timeout on Solaris Sparc
 log_tables-big           : Bug#11756699 2010-11-15 mattiasj report already exists
 mysql_embedded           : Bug#12561297 2011-05-14 Anitha Dependent on PB2 changes - eventum#41836
-- 
cgit v1.2.1

