From 803677d567a769f33d3e4f96d7310f7f12eb3f03 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Marko=20M=C3=A4kel=C3=A4?= <marko.makela@mariadb.com>
Date: Fri, 3 Dec 2021 20:04:50 +0200
Subject: Disable some failing tests (FIXME)

FIXME: Correct the log_sys.get_sequence_bit() calculation. Possibly, introduce a
"start LSN" field in the log file header (corresponding to a record that
starts right after the 2 checkpoint blocks) and calculate the sequence bit based
on the file size and the number of bytes written since then.
---
 mysql-test/suite/encryption/disabled.def | 1 +
 1 file changed, 1 insertion(+)
 create mode 100644 mysql-test/suite/encryption/disabled.def

(limited to 'mysql-test/suite/encryption/disabled.def')

diff --git a/mysql-test/suite/encryption/disabled.def b/mysql-test/suite/encryption/disabled.def
new file mode 100644
index 00000000000..e3a4ab31482
--- /dev/null
+++ b/mysql-test/suite/encryption/disabled.def
@@ -0,0 +1 @@
+innodb_encrypt_log_corruption : MDEV-14425 TODO
-- 
cgit v1.2.1

