From f41464f878726de7490ea2457060ff0b93dcd138 Mon Sep 17 00:00:00 2001
From: Filipa Lacerda <filipa@gitlab.com>
Date: Tue, 29 Aug 2017 18:19:59 +0100
Subject: Fixes the margin of the top buttons of the pipeline page

---
 app/assets/javascripts/pipelines/components/pipelines.vue | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'app/assets/javascripts/pipelines/components/pipelines.vue')

diff --git a/app/assets/javascripts/pipelines/components/pipelines.vue b/app/assets/javascripts/pipelines/components/pipelines.vue
index 5df317a76bf..010063a0240 100644
--- a/app/assets/javascripts/pipelines/components/pipelines.vue
+++ b/app/assets/javascripts/pipelines/components/pipelines.vue
@@ -139,7 +139,9 @@
   };
 </script>
 <template>
-  <div :class="cssClass">
+  <div
+    class="pipelines-container"
+    :class="cssClass">
     <div
       class="top-area scrolling-tabs-container inner-page-scroll-tabs"
       v-if="!isLoading && !shouldRenderEmptyState">
-- 
cgit v1.2.1

