From 49fd7fa4431da299196d74087df4a04f99f9c46f Mon Sep 17 00:00:00 2001
From: Thomas Wouters <thomas@python.org>
Date: Fri, 21 Apr 2006 10:40:58 +0000
Subject: Merge p3yk branch with the trunk up to revision 45595. This breaks a
 fair number of tests, all because of the codecs/_multibytecodecs issue
 described here (it's not a Py3K issue, just something Py3K discovers):
 http://mail.python.org/pipermail/python-dev/2006-April/064051.html

Hye-Shik Chang promised to look for a fix, so no need to fix it here. The
tests that are expected to break are:

test_codecencodings_cn
test_codecencodings_hk
test_codecencodings_jp
test_codecencodings_kr
test_codecencodings_tw
test_codecs
test_multibytecodec

This merge fixes an actual test failure (test_weakref) in this branch,
though, so I believe merging is the right thing to do anyway.
---
 Doc/lib/libzlib.tex | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'Doc/lib/libzlib.tex')

diff --git a/Doc/lib/libzlib.tex b/Doc/lib/libzlib.tex
index 2df8b85fa9..dfbb43d533 100644
--- a/Doc/lib/libzlib.tex
+++ b/Doc/lib/libzlib.tex
@@ -166,11 +166,14 @@ continue.  If \var{max_length} is not supplied then the whole input is
 decompressed, and \member{unconsumed_tail} is an empty string.
 \end{methoddesc}
 
-\begin{methoddesc}[Decompress]{flush}{}
+\begin{methoddesc}[Decompress]{flush}{\optional{length}}
 All pending input is processed, and a string containing the remaining
 uncompressed output is returned.  After calling \method{flush()}, the
 \method{decompress()} method cannot be called again; the only realistic
 action is to delete the object.
+
+The optional parameter \var{length} sets the initial size of the
+output buffer.
 \end{methoddesc}
 
 \begin{seealso}
-- 
cgit v1.2.1

