From ffbe68723a5cb124a1e018d05af9e279ae1ad6fe Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Thu, 22 Apr 1999 21:23:22 +0000
Subject: Make internal module references hyperlinks wherever it makes sense.

---
 Doc/lib/libthreading.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'Doc/lib/libthreading.tex')

diff --git a/Doc/lib/libthreading.tex b/Doc/lib/libthreading.tex
index 343cc740ea..b9f4e056c5 100644
--- a/Doc/lib/libthreading.tex
+++ b/Doc/lib/libthreading.tex
@@ -6,7 +6,7 @@
 
 
 This module constructs higher-level threading interfaces on top of the 
-lower level \module{thread} module.
+lower level \refmodule{thread} module.
 
 This module is safe for use with \samp{from threading import *}.  It
 defines the following functions and objects:
@@ -91,7 +91,7 @@ All of the methods described below are executed atomically.
 A primitive lock is a synchronization primitive that is not owned
 by a particular thread when locked.  In Python, it is currently
 the lowest level synchronization primitive available, implemented
-directly by the \module{thread} extension module.
+directly by the \refmodule{thread} extension module.
 
 A primitive lock is in one of two states, ``locked'' or ``unlocked''.
 It is created in the unlocked state.  It has two basic methods,
-- 
cgit v1.2.1

