From bcd1df746de6fada5dab4ce261637ce48c06e118 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Thu, 5 Jul 2001 21:17:08 +0000
Subject: The fpectl module does not work on Windows, so remove Windows from
 the \platform statement.

Also fix a minor style consistency nit in an example.
---
 Doc/lib/libfpectl.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'Doc/lib/libfpectl.tex')

diff --git a/Doc/lib/libfpectl.tex b/Doc/lib/libfpectl.tex
index 53c3406aff..814e226575 100644
--- a/Doc/lib/libfpectl.tex
+++ b/Doc/lib/libfpectl.tex
@@ -2,7 +2,7 @@
          Floating point exception control}
 
 \declaremodule{extension}{fpectl}
-  \platform{Unix, Windows}
+  \platform{Unix}
 \moduleauthor{Lee Busby}{busby1@llnl.gov}
 \sectionauthor{Lee Busby}{busby1@llnl.gov}
 \modulesynopsis{Provide control for floating point exception handling.}
@@ -18,7 +18,7 @@ For example, try
 >>> import math
 >>> math.exp(1000)
 inf
->>> math.exp(1000)/math.exp(1000)
+>>> math.exp(1000) / math.exp(1000)
 nan
 \end{verbatim}
 
-- 
cgit v1.2.1

