From a18af4e7a2091d11478754eb66ae387a85535763 Mon Sep 17 00:00:00 2001
From: Georg Brandl <georg@python.org>
Date: Sat, 21 Apr 2007 15:47:16 +0000
Subject: PEP 3114: rename .next() to .__next__() and add next() builtin.

---
 Doc/lib/libexcs.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'Doc/lib/libexcs.tex')

diff --git a/Doc/lib/libexcs.tex b/Doc/lib/libexcs.tex
index 02e99a7983..d119ed9893 100644
--- a/Doc/lib/libexcs.tex
+++ b/Doc/lib/libexcs.tex
@@ -265,8 +265,8 @@ Raised when an \keyword{assert} statement fails.
 \end{excdesc}
 
 \begin{excdesc}{StopIteration}
-  Raised by an iterator's \method{next()} method to signal that there
-  are no further values.
+  Raised by builtin \function{next()} and an iterator's \method{__next__()}
+  method to signal that there are no further values.
   This is derived from \exception{Exception} rather than
   \exception{StandardError}, since this is not considered an error in
   its normal application.
-- 
cgit v1.2.1

