kind: autotools
depends:
- xorg-util-macros-common.bst
- x-common/xcb-libxcb.bst
- x-common/xorg-lib-libXau.bst
- x-common/xorg-lib-libX11.bst
- x-common/xorg-lib-libXext.bst
- x-common/xorg-lib-libXfixes.bst
- x-common/xorg-proto-fixesproto.bst
- x-common/xorg-proto-inputproto.bst
- x-common/xorg-proto-x11proto.bst
- x-common/xorg-proto-xextproto.bst
sources:
- kind: git
  url: upstream:xorg-lib-libXi
  track: libXi-1.7.5
  ref: f180dff710dc54d00e0e26b84de053151f8f207e
