kind: autotools
description: |-
  xkbcommon is a library to handle keyboard descriptions.

  This version is built without X11 support. If built with X11 support,
  it depends on the xcb-xkb library.
depends:
- device-management.bst
- foundation.bst
- glib-common.bst
- xorg-util-macros-common.bst
- x-common.bst
- input-common/xkeyboard-config.bst
sources:
- kind: git
  url: upstream:xorg-lib-libxkbcommon
  track: xkbcommon-0.5.0
  ref: c43c3c866eb9d52cd8f61e75cbef1c30d07f3a28
config:
  configure-commands:
  - ./autogen.sh --prefix="%{prefix}" --sysconfdir=/etc --disable-x11
