kind: autotools
depends:
- glib-common.bst
- mesa-common.bst
- x-common.bst
- icu-common.bst
- graphics-common/colm-tarball.bst
sources:
- kind: git
  url: upstream:ragel-tarball
  track: ragel-6.10
  ref: d13d67a31c451ebd78ce708a4ef85803d429f158
