kind: autotools
depends:
- glib-common.bst
- mesa-common.bst
- x-common.bst
- icu-common.bst
sources:
- kind: git
  url: upstream:freetype2
  track: VER-2-6-2
  ref: 66cf29b1bc869b44863b0de2115bd017dfcce849
