From dbd5f6fccededb3bd18791eac43fd88d36e90f00 Mon Sep 17 00:00:00 2001
From: Francisco Redondo Marchena <francisco.marchena@codethink.co.uk>
Date: Thu, 28 Jun 2018 12:31:56 +0100
Subject: freetype2-harfbuzz: remove this element

This element was the same as freetype2. It was tracking the same
tag and reference.
This patch removes this element and replaces it by freetype2
in elements which depends on it.
---
 elements/graphics-common.bst | 1 -
 1 file changed, 1 deletion(-)

(limited to 'elements/graphics-common.bst')

diff --git a/elements/graphics-common.bst b/elements/graphics-common.bst
index 0790ec5f..c82fbace 100644
--- a/elements/graphics-common.bst
+++ b/elements/graphics-common.bst
@@ -5,7 +5,6 @@ depends:
 - graphics-common/colm-tarball.bst
 - graphics-common/ragel-tarball.bst
 - graphics-common/harfbuzz.bst
-- graphics-common/freetype2-harfbuzz.bst
 - graphics-common/fontconfig.bst
 - graphics-common/freefont-otf.bst
 - graphics-common/ttf-alee.bst
-- 
cgit v1.2.1

