From 8e880181f2cb365c80f0b05ac452710ece8a9d0c Mon Sep 17 00:00:00 2001
From: Sam Thursfield <sam.thursfield@codethink.co.uk>
Date: Thu, 26 Oct 2017 14:52:08 +0000
Subject: Disable debug section compression in stage3

The objcopy tool that we built in stage2 doesn't have zlib support, so
it can't handle the `--compress-debug-sections` flag that BuildStream
passes by default.
---
 elements/gnu-toolchain/ccache.bst | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'elements/gnu-toolchain/ccache.bst')

diff --git a/elements/gnu-toolchain/ccache.bst b/elements/gnu-toolchain/ccache.bst
index f66a37ca..7e435476 100644
--- a/elements/gnu-toolchain/ccache.bst
+++ b/elements/gnu-toolchain/ccache.bst
@@ -26,3 +26,7 @@ config:
     done
   - for cc in gcc cc g++ c++; do ln -sf "%{prefix}/bin/ccache" "%{install-root}%{prefix}/lib/ccache/%{target}-$cc";
     done
+
+  strip-commands:
+  - |
+    %{stage3-strip-binaries}
-- 
cgit v1.2.1

